en	Tiny Tiny RSS pillar generator

en	Web address of your Tiny Tiny RSS instance (without {{- opentag}}http(s)://{{- endtag}})

en	How many CPU threads should be allocated to the update daemon?

en	Display name of the email’s sender

en	Maximum number of accounts (when this number is reached, registrations are disabled. For an unlimited number of accounts, put {{- opentag}}0{{- endtag}})

en	The login of the admin account is, without surprise, {{- opentag}}admin{{- endtag}}.

en	Apticron is a program that runs daily on your server and notifies you by email if package updates are available.

en	Install apticron? {{- opentag}}recommended{{- endtag}}

en	Recipient for apticron’s emails ({{- opentag}}root{{- endtag}} is ok if you configured a real address in {{- opentag}}/etc/aliases{{- endtag}}