en	Buffer Progress

en	Buffer State

en	off

en	Player mode

en	Stream Type

en	Loaded

en	Progress

en	Progress Bar

en	progress bar timing: currentTime={1} duration={2}

en	Descriptions

en	descriptions off

en	No compatible source was found for this media.

en	The media is encrypted and we do not have the keys to decrypt it.

en	Modal Window

en	This is a modal window

en	This modal can be closed by pressing the Escape key or activating the close button.

en	, opens captions settings dialog

en	, opens subtitles settings dialog

en	, opens descriptions settings dialog

en	, selected

en	captions settings

en	subtitles settings

en	descriptions settings

en	Caption Settings Dialog

en	Beginning of dialog window. Escape will cancel and close the window.

en	End of dialog window.