en	If equal to "json", response will be in JSON format, HTML format otherwise

en	If you are logged in as admin ("adminpwd" or "hashed_adminpwd" setting), it will give you statistics for all URLs, sorted by the most visited first, paginated with pages containing %1 records.

en	If you are logged in as admin, you can provide a "page" parameter

en	It will use Lstu's cookies to know which shortened URL it will return statistics for.

en	No shortened URL available. Please retry or contact the administrator at %1. Your URL to shorten: %2

en	The URL host or one of its redirection(s) (%1) is blacklisted at Spamhaus. I refuse to shorten it.

en	The URL or one of its redirection(s) (%1) is blacklisted in Google Safe Browsing database. I refuse to shorten it.

en	The URL redirects %1 times or most. It's most likely a dangerous URL (spam, phishing, etc.). I refuse to shorten it.

en	The URL you want to shorten comes from a domain (%1) that is blacklisted on this server (usually because of spammers that use this domain).

en	The shortened text can't be "a", "api", "d", "cookie", "stats", "fullstats", "login" or "logout" or end with ".json". Your URL to shorten: %1

en	To do an admin login, set it to the password defined in the settings ("adminpwd" or "hashed_adminpwd")

en	To do an admin logout, set it to "logout".

en	URL to shorten

en	You asked to shorten too many URLs too quickly. You're banned for %1 hour(s).

en	You have been successfully logged in.

en	You have been successfully logged out.

en	You must be logged in as admin ("adminpwd" or "hashed_adminpwd" setting) to use it.

en	You must be logged in to use it.

en	You will be redirected to Lstu statistics page

en	You will be redirected to Lstu statistics page with a message in case of failure

en	You will be redirected to Lstu successfully logged out interface

en	You will be redirected to the Lstu classic interface where you will be able to shorten URLs

en	You will be redirected to the Lstu classic interface with a message giving the shortened URL

en	You will be redirected to the targeted URL or to the Lstu interface with a message giving the failure reason

en	You will have the statistics page with the admin stats if you're succesfully logged in, or your stats and a failure message otherwise

en	You're not authenticated as the admin

en	Your login

en	Your password

en	integer, how many unique visits of the shortened URL

en	mandatory

en	optional

en	shortened_url