en	%1 is not a valid URL.
de	%1 ist keine gültige URL.

en	A page with a table containing the same informations that the JSON response
de	Eine Seite mit einer Tabelle mit derselben Info als in der JSON Antwort

en	About
de	Über

en	Admin password
de	Admin Passwort

en	Bad password
de	Falsches Passwort

en	Copy to clipboard
de	Zu Zwischenablage Speichern

en	Counter
de	Zähler

en	Created
de	Erstellt

en	Custom shortened text
de	Benutzerdefinierter verkürzter Text

en	Delete
de	Löschen

en	Export your URLs
de	URLs exportieren

en	Failure reason
de	Fehlergrund

en	File imported
de	Datei wurde importiert

en	Get the details (visit counter, creation date, etc.) of a shortened URL.
de	Ermitteln Sie die Details (Besuchszähler, Erstellungsdatum usw.) einer verkürzten URL.

en	Go!

en	Hit Enter, then Ctrl+C to copy the short link
de	Enter drücken, dann Strg+C um den kurzen Link zu kopieren.

en	Home
de	Heim

en	If "action" is defined to "logout":
de	Wenn "aktion" als "logout" definiert ist.

en	If "adminpwd" is defined:
de	Wenn "adminpwd" definiert ist:

en	If equal to "json", response will be in JSON format, HTML format otherwise

en	If you are logged in as admin ("adminpwd" or "hashed_adminpwd" setting), it will give you statistics for all URLs, sorted by the most visited first, paginated with pages containing %1 records.

en	If you are logged in as admin, you can provide a "page" parameter

en	Import URLs
de	URLs importieren

en	It will use Lstu's cookies to know which shortened URL it will return statistics for.

en	JSON: failure
de	JSON: Fehler

en	JSON: success
de	JSON: Erfolgreich

en	License:
de	Lizenz:

en	Login

en	Logout

en	Logout from admin stats
de	Von Admin Statistik Ausloggen

en	Next
de	Nächst

en	No shortened URL available. Please retry or contact the administrator at %1. Your URL to shorten: %2

en	Parameters:
de	Parameter

en	Password
de	Passwort

en	Please, check your credentials: unable to authenticate.
de	Bitte überprüfen Sie Ihre Logindaten: konnte nicht Authentifizieren.

en	Previous
de	Bisherige

en	QRCode
de	QR-Code

en	Response for HTML format
de	Antwort zu HTML Format

en	Response for JSON format
de	Antwort zu JSON Format

en	Response:
de	Antwort:

en	Shortened URL
de	Verkürzte URL

en	Should always be successful
de	Sollte immer erfolgreich sein

en	Signin
de	Einloggen

en	Sorry, unable to parse the provided file
de	Entschuldigen Sie, das Lesen der Datei schlug fehl

en	Statistics
de	Statistiken

en	The URL host or one of its redirection(s) (%1) is blacklisted at Spamhaus. I refuse to shorten it.

en	The URL or one of its redirection(s) (%1) is blacklisted in Google Safe Browsing database. I refuse to shorten it.

en	The URL redirects %1 times or most. It's most likely a dangerous URL (spam, phishing, etc.). I refuse to shorten it.

en	The URL you want to shorten comes from a domain (%1) that is blacklisted on this server (usually because of spammers that use this domain).

en	The shortened URL %1 doesn't exist.
de	Die verkürzte URL %1 existiert nicht.

en	The shortened URL %1 no longer exists.
de	Die verkürzte URL %1 existiert nicht mehr.

en	The shortened text can't be "a", "api", "d", "cookie", "stats", "fullstats", "login" or "logout" or end with ".json". Your URL to shorten: %1

en	To do an admin login, set it to the password defined in the settings ("adminpwd" or "hashed_adminpwd")

en	To do an admin logout, set it to "logout".

en	Too many bad passwords. You're banned.
de	Zu viele fehlerhafte Passworte. Sie sind nun geblockt.

en	URL

en	URL to shorten

en	You asked to shorten too many URLs too quickly. You're banned for %1 hour(s).

en	You have been successfully logged in.

en	You have been successfully logged out.

en	You must be logged in as admin ("adminpwd" or "hashed_adminpwd" setting) to use it.

en	You must be logged in to use it.

en	You will be redirected to Lstu statistics page

en	You will be redirected to Lstu statistics page with a message in case of failure

en	You will be redirected to Lstu successfully logged out interface

en	You will be redirected to the Lstu classic interface where you will be able to shorten URLs

en	You will be redirected to the Lstu classic interface with a message giving the shortened URL

en	You will be redirected to the targeted URL or to the Lstu interface with a message giving the failure reason

en	You will have the statistics page with the admin stats if you're succesfully logged in, or your stats and a failure message otherwise

en	You're not authenticated as the admin

en	Your login

en	Your password

en	integer, how many unique visits of the shortened URL

en	mandatory

en	optional

en	shortened_url