en	A page with a table containing the same informations that the JSON response

en	Get the details (visit counter, creation date, etc.) of a shortened URL.

en	If "action" is defined to "logout":

en	If you are logged in as admin ("adminpwd" or "hashed_adminpwd" setting), it will give you statistics for all URLs, sorted by the most visited first, paginated with pages containing %1 records.

en	If you are logged in as admin, you can provide a "page" parameter

en	It will use Lstu's cookies to know which shortened URL it will return statistics for.

en	Please, check your credentials: unable to authenticate.

en	Sorry, unable to parse the provided file

en	The URL or one of its redirection(s) (%1) is blacklisted in Google Safe Browsing database. I refuse to shorten it.

en	The URL you want to shorten comes from a domain (%1) that is blacklisted on this server (usually because of spammers that use this domain).

en	The shortened URL %1 no longer exists.

en	The shortened text can't be "a", "api", "d", "cookie", "stats", "fullstats", "login" or "logout" or end with ".json". Your URL to shorten: %1

en	To do an admin login, set it to the password defined in the settings ("adminpwd" or "hashed_adminpwd")

en	To do an admin logout, set it to "logout".

en	You have been successfully logged in.

en	You have been successfully logged out.

en	You must be logged in as admin ("adminpwd" or "hashed_adminpwd" setting) to use it.

en	You must be logged in to use it.

en	You will be redirected to Lstu statistics page

en	You will be redirected to Lstu statistics page with a message in case of failure

en	You will be redirected to Lstu successfully logged out interface

en	You will be redirected to the Lstu classic interface where you will be able to shorten URLs

en	You will be redirected to the Lstu classic interface with a message giving the shortened URL

en	You will have the statistics page with the admin stats if you're succesfully logged in, or your stats and a failure message otherwise

en	You're not authenticated as the admin

en	Your login

en	Your password

en	integer, how many unique visits of the shortened URL