en	%1 is not a valid URL.
br	%1 n'eo ket un URL talvoudek.

en	A page with a table containing the same informations that the JSON response

en	About
br	A-zivout

en	Admin password
br	Ger-tremen ar merour

en	Bad password
br	Ger-tremen didalvoudek

en	Copy to clipboard
br	Eilañ er golver

en	Counter
br	Konter

en	Created
br	Krouet

en	Custom shortened text
br	Testenn verr personelaet

en	Delete
br	Dilemel

en	Export your URLs
br	Ezporzhiañ hoc’h URLoù

en	Failure reason
br	Abeg ar c'hwitadenn

en	File imported
br	Restr bet emporzhiet

en	Get the details (visit counter, creation date, etc.) of a shortened URL.

en	Go!
br	Deomp !

en	Hit Enter, then Ctrl+C to copy the short link
br	Pouezit war Enankañ, ha Reol+C evit eilañ an ere berr

en	Home
br	Degemer

en	If "action" is defined to "logout":

en	If "adminpwd" is defined:
br	Ma 'z eo termenet "adminpwd" :

en	If equal to "json", response will be in JSON format, HTML format otherwise
br	M'eo kevatal da "json" e vo ar respont er mentrezh JSON, e mod all e vo e HTML

en	If you are logged in as admin ("adminpwd" or "hashed_adminpwd" setting), it will give you statistics for all URLs, sorted by the most visited first, paginated with pages containing %1 records.

en	If you are logged in as admin, you can provide a "page" parameter

en	Import URLs
br	Enporzhiañ URLoù

en	It will use Lstu's cookies to know which shortened URL it will return statistics for.

en	JSON: failure
br	JSON : c'hwitadenn

en	JSON: success
br	JSON : berzh

en	License:
br	Lañvaz :

en	Login
br	Kevreañ

en	Logout
br	Digevreañ

en	Logout from admin stats
br	Digennaskañ eus stadegoù an ardoer

en	Next
br	Da-heul

en	No shortened URL available. Please retry or contact the administrator at %1. Your URL to shorten: %2
br	N'eus URL berr ebet hegerz. Klaskit en-dro pe kit e darempred gant an ardoer e %1. Hoc'h URL da verraat : %2

en	Parameters:
br	Arventennoù :

en	Password
br	Ger-tremen

en	Please, check your credentials: unable to authenticate.

en	Previous
br	Kent

en	QRCode
br	Kod QR

en	Response for HTML format
br	Respont evit ar mentrezh HTML

en	Response for JSON format
br	Respont evit ar furmad JSON

en	Response:
br	Respont :

en	Shortened URL
br	URL berraet

en	Should always be successful
br	Rankout a rafe kas en-dro un disoc'h gant berzh

en	Signin
br	Lugañ

en	Sorry, unable to parse the provided file

en	Statistics
br	Stadegoù

en	The URL host or one of its redirection(s) (%1) is blacklisted at Spamhaus. I refuse to shorten it.
br	Ostiz an URL pe unan eus e adheñchadennoù (%1) a zo e roll du Spamhaus. Ne fell ket din e verraat.

en	The URL or one of its redirection(s) (%1) is blacklisted in Google Safe Browsing database. I refuse to shorten it.

en	The URL redirects %1 times or most. It's most likely a dangerous URL (spam, phishing, etc.). I refuse to shorten it.
br	Adheñchet eo an URL %1 gwech pe ouzhpenn. Moarvat eo un URL arvarus (spam, phishing...). Ne fell ket din e verraat.

en	The URL you want to shorten comes from a domain (%1) that is blacklisted on this server (usually because of spammers that use this domain).

en	The shortened URL %1 doesn't exist.
br	N'eus ket eus an URL berraet %1.

en	The shortened URL %1 no longer exists.

en	The shortened text can't be "a", "api", "d", "cookie", "stats", "fullstats", "login" or "logout" or end with ".json". Your URL to shorten: %1

en	To do an admin login, set it to the password defined in the settings ("adminpwd" or "hashed_adminpwd")

en	To do an admin logout, set it to "logout".

en	Too many bad passwords. You're banned.
br	Re a ger-tremen didalvoudek. Forbannet oc'h.

en	URL

en	URL to shorten
br	URL da verraat

en	You asked to shorten too many URLs too quickly. You're banned for %1 hour(s).
br	Goulennet hoc'h eus da verraat re a URLoù en un amzer re verr. Forbannet hoc'h e-pad %1 eur.

en	You have been successfully logged in.

en	You have been successfully logged out.

en	You must be logged in as admin ("adminpwd" or "hashed_adminpwd" setting) to use it.

en	You must be logged in to use it.

en	You will be redirected to Lstu statistics page

en	You will be redirected to Lstu statistics page with a message in case of failure

en	You will be redirected to Lstu successfully logged out interface

en	You will be redirected to the Lstu classic interface where you will be able to shorten URLs

en	You will be redirected to the Lstu classic interface with a message giving the shortened URL

en	You will be redirected to the targeted URL or to the Lstu interface with a message giving the failure reason
br	Adheñchet e viot davet an URL bukenn pe ketal Ltsu gant ur gemennadenn a roio abeg ar c'hwitadenn

en	You will have the statistics page with the admin stats if you're succesfully logged in, or your stats and a failure message otherwise

en	You're not authenticated as the admin

en	Your login

en	Your password

en	integer, how many unique visits of the shortened URL

en	mandatory
br	ret

en	optional
br	diret

en	shortened_url
br	url_berraet