en	"%1" is already announced.

en	"%1" is not a valid IP address or network.

en	"%1" is not a valid community (not declared in Erco configuration).

en	"%1" is not a valid next hop (not declared in Erco configuration).

en	Actions

en	Add

en	Announce a new network or IP

en	Announced networks

en	Buy the ebook (french only)

en	Cancel

en	Clear command output

en	Communities

en	Communities:

en	Confirm

en	Created at

en	Exabgp has been reloaded but is not running.

en	Exabgp has been successfully reloaded.

en	Exabgp is running

en	Getting Exabgp status

en	IP or network in CIDR notation

en	Launch command

en	Local preference

en	Local preference:

en	Modified at

en	Modify

en	Modify network

en	Network

en	Network can not be empty!

en	Network successfully deleted.

en	Network:

en	Next hop

en	Next hop:

en	No community. Please choose at least one community.

en	Please confirm the addition of the following network

en	Please confirm the deletion of the following network

en	Please, confirm your action

en	Reload Exabgp

en	Unable to fetch Exabgp status: PID file missing or not readable!

en	Unable to find or modify the network with id %1. Please contact the administrator.

en	Unable to found the network with id = %1

en	WARNING! Exabgp is NOT running!

en	We tried to reload Exabgp but it failed (WebSocket handshake failed). Contact an administrator.

en	WebSocket handshake failed!

en	You must select communities!

en	You tried to launch an unauthorized command. Contact an administrator.